Cold events during the 60-day interval following the onset of weak and strong vortex conditions at 10-hPa. Individual results not exceeding the 95% confidence level are italicized. Event type and location Total Weak Strong < -17° C in Juneau, Ak. 334 104 66 < -18° C in Chicago, Il. 411 149 67 < -6° C in Atlanta, Ga. 416 149 73 < -10° C in Washington, D. C. 392 153 77 < -9° C New York, NY. 403 164 99 < 1° C in London, UK 442 157 77 < -3° C in Paris, Fr. 446 148 68 <-9° C in Stockholm, Sw. 348 154 54 <-9° C in Berlin, Ger. 450 142 77 < -22° C in St. Petersburg, Ru. 381 137 46 < -20° C in Moscow, Ru. 472 152 80 < -29° C in Novosibirsk, Ru. 480 155 69 < -4° C in Shanghai, China 471 170 84 < -1° C in Tokyo, Japan 328 130 60 Thompson, Baldwin, and Wallace, J. Climate 2001