January-March means of the standardized daily index, 1900-2002. Vertical tickmarks are 1 standard deviation of the daily index.

AO index, January-March 1900-2002

Standard De viations

1900 1920 1940 1960 1980 2000

0

www.atmos.colostate.edu/ao David Thompson (davet@atmos.colostate.edu)